  {FEED}  - Prepare for New Page on the Printer
  {LIST}  - Send a file to the Printer
:
	 {FEED}  - Prepare for New Page on Printer

   This command sends a Carriage Return (0AH) followed by a Form Feed
character (0CH) to the printer to prepare for printing in the first
column of a new page.

Syntax:		FEED

:
	 {LIST}  - Send a file to the Printer

   This command sends a file to the printer using Bdos functions.

Syntax:		LIST [DU: | DIR:]Filename[.Typ]

NOTE: Printing may be paused and restarted with the Bdos Ctrl-S
toggle.  To abort printing, follow a Ctrl-S with a Ctrl-C.
